\section{Publications}

\begin{description}

\item
``Stochastic Mixed-Signal VLSI Architecture for High-Dimensional
Kernel Machines,'' R.~Genov, G.~Cauwenberghs, to appear in {\it
Advances in Neural Information Processing Systems,} Cambridge, MA: MIT
Press, 2001.

\item
``CID/DRAM Mixed-Signal Parallel Distributed Array Processor,''
R.~Genov, G.~Cauwenberghs, to appear in {\it Proc. of 14th
International IEEE ASIC/SOC Conference (ASIC/SOC'2001),} Washington,
DC, 2001.

\item
``Embedded Dynamic Memory and Charge-Mode Logic for Parallel Array
Processing,'' R.~Genov, G.~Cauwenberghs, {\it Proc. of the 5th World
Multi-Conference on Systemics, Cybernetics and Informatics
(SCI'2001),} Orlando, FL, July~22-25, 2001. A {\bf Best Paper Award.}

\item
``Massively Parallel Inner-Product Array Processor,'' R.~Genov,
G.~Cauwenberghs, {\it Proc. of International Joint Conference on
Neural Networks (IJCNN'2001),} Washington, DC, July~15-19, 2001.

\item
``Analog Array Processor with Digital Resolution Enhancement and
Offset Compensation,'' R.~Genov, G.~Cauwenberghs, {\it Proc. of
Conference on Information Sciences and Systems (CISS'2001),}
Baltimore, MD, March~21-23, 2001.

\item
``Charge-Mode Parallel Architecture for Matrix-Vector
Multiplication,'' R.~Genov and G.~Cauwenberghs, to appear in {\it IEEE
Trans.\ on Circuits and Systems~II: Analog and Digital Signal
Processing} (invited).

\item
``Charge-Mode Parallel Architecture for Matrix-Vector
Multiplication,'' R.~Genov and G.~Cauwenberghs, {\it Proc.\ of 43rd
IEEE Midwest Symposium on Circuits and Systems (MWSCAS'2000),} Lansing,
MI, Aug.~8-11, 2000. {\bf Best Student Paper Award, 3rd place.}

\item
``Learning to Navigate from Limited Sensory Input: Experiments with
the Khepera Microrobot,'' R.~Genov, S.~Madhavapeddi and
G.~Cauwenberghs, {\it Proc. of International Joint Conference on
Neural Networks (IJCNN'99),} Washington, DC, vol.~3, pp.~2061-2064,
1999.  {\bf Best Presentation Award.}

\item
``16-Channel Single-Chip Current-Mode Track-and-Hold Acquisition
System with 100 dB Dynamic Range,'' R.~Genov and G.~Cauwenberghs, {\it
Proc.\ of IEEE International Symposium on Circuits and Systems
(ISCAS'99),} Orlando, FL, vol.~6, pp.~350-353, 1999. {\bf Best Student
Paper Contest Finalist.}

\end{description}

\section{Publications under preparation}

\begin{description}

\item
``Parallel Vector-Matrix Multiplier on an array of embedded Dynamic
Random Access Memories (DRAM) and Charge Injection Devices (CID) and
method thereof,'' R.~Genov and G.~Cauwenberghs, patent application to
be filed.

\item
``Algorithmic Delta-Sigma Analog-to-Digital Converters,'' R.~Genov,
F.~Adil, G.~Mulliken, and G.~Cauwenberghs, patent application to be
filed.

\item ``Charge-Mode Gray-Coded Folded A/D Converter,'' R.~Genov and
G.~Cauwenberghs, to be submitted to IEEE International Symposium on
Circuits and Systems (ISCAS'2002),} Phoenix, AZ, May~26-29, 2002.

\item
``Charge-Mode Gray-Coded Folded A/D Converter,'' R.~Genov and
G.~Cauwenberghs, to be submitted to Electronics Letters.

\item
``Algorithmic Delta-Sigma Analog-to-Digital Converters,'' R.~Genov,
F.~Adil, G.~Mulliken, and G.~Cauwenberghs, to be submitted to IEEE
International Symposium on Circuits and Systems (ISCAS'2002),}
Phoenix, AZ, May~26-29, 2002.

\item
``Algorithmic Delta-Sigma Analog-to-Digital Converters,'' R.~Genov,
F.~Adil, G.~Mulliken, and G.~Cauwenberghs, to be submitted to {\it
IEEE Trans.\ on Circuits and Systems~II: Analog and Digital Signal
Processing.}

\item
``128-Channel Mixed-Signal Micropower VLSI Systems Testing Station,''
R.~Genov, M.~Stanacevic and G.~Cauwenberghs to be submitted to IEEE
International Symposium on Circuits and Systems (ISCAS'2002),}
Phoenix, AZ, May~26-29, 2002.

\item
``A 12-bit 30MHz Blindly Calibrated Algorithmic Pipelined ADC,''
R.~Genov, K.~He and G.~Cauwenberghs, to be submitted to {\it IEEE
Trans.\ on Circuits and Systems~II: Analog and Digital Signal
Processing.}

\item
``Stochastic Mixed-Signal VLSI Architecture for High-Dimensional
Computational Arrays,'' R.~Genov, G.~Cauwenberghs, to be submitted to
{\it IEEE Trans.\ on Circuits and Systems~II: Analog and Digital
Signal Processing.}

\item
``16-Channel Single-Chip Current-Mode Track-and-Hold Acquisition
System with 100 dB Dynamic Range,'' R.~Genov and G.~Cauwenberghs, to
be submitted to {\it IEEE Trans.\ on Circuits and Systems~II: Analog
and Digital Signal Processing.}

\end{description}






